Mentiroso

VanillaPuF

Rating: PG13
Genres: Romance, Humor
Relationships: Draco & Ginny
Book: Draco & Ginny, Books 1 - 5
Published: 15/09/2004
Last Updated: 15/09/2004
Status: completed

Draco is swindled into boywatching with Ginny. A questionable situation arises, and accusations fly! Fun for the whole family. Actually just the D/G shipper looking for a laugh. Highish PG13.

Chapters

1. mentiroso

1. mentiroso