UnSpeakable

HarrysAngel

Rating: PG
Genres: Angst, Drama
Relationships: Harry & Hermione
Book: Harry & Hermione, Books 1 - 6
Published: 22/12/2005
Last Updated: 22/12/2005
Status: completed

He called them punishment headaches. Punishment for having a daughter who was like Landry.

Chapters

1. untitled

1. untitled